Women’s basketball: Kansas City’s second quarter collapse leads to loss against Northern Iowa

After being selected into the WNIT tournament, the Kansas City Roos bowed out quickly after losing to the Northern Iowa Panthers 75-58.  Senior guard Naomie Alnatas led the team once again in scoring, totaling 24 points in 35 minutes. She also provided three steals, five rebounds and three assists. However, her four turnovers were momentum...