Kansas City Women’s Basketball Come up Short in Season Finale

Kansas City’s women’s basketball came up short in their final game of the season, losing to South Dakota State 72-66. The Roos finished the regular season with a 10-11 record. This game was the second of a back-to-back series matchup between the two teams. South Dakota State came out on top in the first game...